= Google Pixel 2
include::_support/common.inc[]

== Device-specific notes

=== Serial access

Adding this to your configuration will make it so the shell in initrd will
be on `ttyMSM0`.

```
mobile.boot.stage-1.shell.console = "ttyMSM0";
```

