---
sidebar_position: 3
title: Set a Default Brain
---

To set a brain as the default for the current user, you need to make a POST request to the following endpoint:

Replace `{brain_id}` with the unique identifier of the brain you want to set as the default.

### Request Parameters

You should include the following parameters in the request:

- **brain_id**: The unique identifier (UUID) of the brain you want to set as the default.

### Example Request

```http
POST /brains/{brain_id}/default HTTP/1.1
Host: your-api-host.com
Authorization: Bearer YOUR_ACCESS_TOKEN
```
