DROP TABLE IF EXISTS hdb_catalog.hdb_source_catalog_version;
DROP TABLE IF EXISTS hdb_catalog.event_invocation_logs;
DROP TABLE IF EXISTS hdb_catalog.event_log;
DROP TABLE IF EXISTS hdb_catalog.hdb_event_log_cleanups;
DROP SCHEMA IF EXISTS hdb_catalog;
